CHAPTER XIV

DATA PROTECTION AND DATA-SHARING

Data protection periods
Article 60
1
Data submitted for the purposes of Directive 98/8/EC or of this Regulation shall benefit from data protection under the conditions laid down in this Article. The protection period for the data shall start when they are submitted for the first time.
Data protected under this Article or for which the protection period under this Article has expired shall not be protected again.
2
The protection period for data submitted with a view to the approval of an existing active substance shall end 10 years from the first day of the month following the date of adoption of a decision in accordance with Article 9 on the approval of the relevant active substance for the particular product-type.
The protection period for data submitted with a view to the approval of a new active substance shall end 15 years from the first day of the month following the date of adoption of a decision in accordance with Article 9 on the approval of the relevant active substance for the particular product-type.
The protection period for new data submitted with a view to the renewal or review of the approval of an active substance shall end five years from the first day of the month following the date of the adoption of a decision in accordance with Article 14(4) concerning the renewal or the review.
3
The protection period for data submitted with a view to the authorisation of a biocidal product containing only existing active substances shall end 10 years from the first day of the month following the first decision concerning the authorisation of the product taken in accordance with Article 26(3)
or 30(1)
.
The protection period for data submitted with a view to the authorisation of a biocidal product containing a new active substance shall end 15 years from the first day of the month following the first decision concerning the authorisation of the product taken in accordance with Article 26(3)
or 30(1)
.
The protection period for new data submitted with a view to the renewal or amendment of the authorisation of a biocidal product shall end five years from the first day of the month following the decision concerning the renewal or amendment of the authorisation.
4
The protection period for data submitted for biocidal products containing only existing active substances which were authorised in the United Kingdom prior to IP completion day shall end 10 years from the first day of the month following the first decision concerning the authorisation of the product taken in accordance with Article 26(3), 30(1), 33(3), 33(4), 34(6), 34(7), 36(4), 37(2), 37(3) or 44(5) of this Regulation as it had effect immediately before IP completion day.
5
The protection period for data submitted for biocidal products containing a new active substance which were authorised in the United Kingdom prior to IP completion day shall end 15 years from the first day of the month following the first decision concerning the authorisation of the product taken in accordance with Article 26(3), 30(1), 33(3), 33(4), 34(6), 34(7), 36(4), 37(2), 37(3) or 44(5) of this Regulation as it had effect immediately before IP completion day.
Substituted by Regulation (EU) No 334/2014 of the European Parliament and of the Council of 11 March 2014 amending Regulation (EU) No 528/2012 concerning the making available on the market and use of biocidal products, with regard to certain conditions for access to the market (Text with EEA relevance).
Art. 60(4)(5) inserted (31.12.2020) by The Chemicals (Health and Safety) and Genetically Modified Organisms (Contained Use) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/720), reg. 1(2), Sch. 2 para. 107(3) (as amended by S.I. 2020/1567, reg. 1(2), Sch. 2 para. 29); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 60(3) substituted (31.12.2020) by The Chemicals (Health and Safety) and Genetically Modified Organisms (Contained Use) (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/720), reg. 1(2), Sch. 2 para. 107(2); 2020 c. 1, Sch. 5 para. 1(1)