CHAPTER II

Minimum requirements for the quality systems for the performance of pharmacovigilance activities
Section 1

General provisions

Quality system
Article 8
1
Marketing authorisation holders, the national competent authorities and the Agency shall establish and use a quality system that is adequate and effective for the performance of their pharmacovigilance activities.
2
The quality system shall cover organisational structure, responsibilities, procedures, processes and resources, appropriate resource management, compliance management and record management.
3
The quality system shall be based on all of the following activities:
a
quality planning: establishing structures and planning integrated and consistent processes;
b
quality adherence: carrying out tasks and responsibilities in accordance with quality requirements;
c
quality control and assurance: monitoring and evaluating how effectively the structures and processes have been established and how effectively the processes are being carried out;
d
quality improvements: correcting and improving the structures and processes where necessary.
4
All elements, requirements and provisions adopted for the quality system shall be documented in a systematic and orderly manner in the form of written policies and procedures, such as quality plans, quality manuals and quality records.
5
All persons involved in the procedures and processes of the quality systems established by the national competent authorities and the Agency for the performance of pharmacovigilance activities shall be responsible for the good functioning of those quality systems and shall ensure a systematic approach towards quality and towards the implementation and maintenance of the quality system.
Regulation revoked in part (31.12.2020) by The Human Medicines (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/775), reg. 1, Sch. 9 para. 1(t) (subject to transitional provisions in S.I. 2012/1916, Sch. 33A); 2020 c. 1, Sch. 5 para. 1(1)