CHAPTER IX

Final provisions

Entry into force and application
Article 41
This Regulation shall enter into force on the twentieth day following that of its publication in the
Official Journal of the European Union
.
It shall apply from 10 July 2012.
Regulation revoked in part (31.12.2020) by The Human Medicines (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/775), reg. 1, Sch. 9 para. 1(t) (subject to transitional provisions in S.I. 2012/1916, Sch. 33A); 2020 c. 1, Sch. 5 para. 1(1)