CHAPTER II

Minimum requirements for the quality systems for the performance of pharmacovigilance activities
Section 3

Minimum requirements for the quality systems for the performance of pharmacovigilance activities by national competent authorities and the Agency

Audit
Article 17
1
Risk-based audits of the quality system shall be performed at regular intervals according to a common methodology to ensure that the quality system complies with the requirements set out in Articles 8, 14, 15 and 16 and to ensure its effectiveness.
2
Corrective action, including a follow-up audit of deficiencies, shall be taken where necessary. The audit report shall be sent to the management responsible for the matters audited. The dates and results of audits and follow-up audits shall be documented.
Regulation revoked in part (31.12.2020) by The Human Medicines (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/775), reg. 1, Sch. 9 para. 1(t) (subject to transitional provisions in S.I. 2012/1916, Sch. 33A); 2020 c. 1, Sch. 5 para. 1(1)