Notification of the tenders to the Commission
Article 6
In accordance with Article 12 of Regulation (EC) No 826/2008 all valid tenders shall be notified separately by Member States to the Commission, within 24 hours from the end of each tendering sub-period as referred to in Article 3(1) of this Regulation.