Submission of tenders
Article 3
1
The sub-period during which tenders may be submitted in response to the first partial invitation to tender shall begin on 31 May 2012 and shall end on 5 June 2012 at 11:00 Brussels time.
The sub-period during which tenders may be submitted in response to the second partial invitation to tender shall begin on the first working day following the end of the preceding sub-period and shall end on 19 June 2012 at 11:00 Brussels time.
2
Tenders shall relate to a storage period of 180 days.
3
Each tender shall cover a minimum quantity of at least 50 tonnes.
4
Where an operator takes part in a tendering procedure for more than one category of oil or for vats located at different addresses, it shall submit a separate tender in each case.
5
Tenders may be lodged only in Greece, Spain, France, Italy, Cyprus, Malta, Portugal and Slovenia.