Article 1
Subject matter and scope
Article 2
Definitions
Article 3
Responsibilities of suppliers
Article 4
Responsibilities of dealers
Article 5
Measurement methods
Article 6
Verification procedure for market surveillance purposes
Article 7
Revision
Article 8
Repeal
Article 9
Transitional provisions
Article 10
Entry into force and application
ANNEX I
Label
1.
LABEL FOR AIR-VENTED HOUSEHOLD TUMBLE DRIER
1.1.
The following information shall be included in the label for...
1.2.
The design of the label for air vented household tumble...
2.
LABEL FOR CONDENSER HOUSEHOLD TUMBLE DRIER
2.1.
In addition to the information listed in point 1.1, the...
2.2.
The design of the label for condenser household tumble driers...
3.
LABEL FOR GAS-FIRED HOUSEHOLD TUMBLE DRIER
3.1.
The information listed in point 1.1 shall be included in...
3.2.
The design of the label for gas fired household tumble...
4.
LABEL DESIGN
4.1.
For air vented household tumble driers, the design of the...
4.2.
For condenser household tumble driers, the design of the label...
4.3.
For gas fired household tumble driers, the design of the...
ANNEX II
Product Fiche
1.
The information in the product fiche of household tumble driers...
2.
One product fiche may cover a number of household tumble...
3.
The information contained in the fiche may be given in...
ANNEX III
Technical documentation
1.
The technical documentation referred to in Article 3(c) shall include:...
2.
Where the information included in the technical documentation for a...
ANNEX IV
Information to be provided in cases where end-users cannot be expected to see the product displayed
1.
The information referred to in Article 4(b) shall be provided...
2.
Where other information contained in the product fiche is also...
3.
The size and font in which all the information referred...
ANNEX V
Product compliance verification by market surveillance authorities
The verification tolerances set out in this Annex relate only...
When verifying the compliance of a product model with the...
The Great Britain authorities shall verify one single unit of...
Great Britain authorities must use measurement procedures which take into...
The Great Britain authorities shall only apply the verification tolerances...
Table 1 Verification tolerances Parameters Verification tolerances Weighted annual energy...
ANNEX VI
Energy efficiency classes and condensation efficiency classes
1.
ENERGY EFFICIENCY CLASSES
2.
CONDENSATION EFFICIENCY CLASSES
ANNEX VII
Method for calculating the Energy Efficiency Index and the weighted condensation efficiency
1.
CALCULATION OF THE ENERGY EFFICIENCY INDEX
2.
CALCULATION FOR THE PRODUCT INFORMATION DESCRIBED IN ‘ANNEX II PRODUCT...
3.
CALCULATION OF THE WEIGHTED CONDENSATION EFFICIENCY
ANNEX VIII
Information to be provided in the case of sale, hire or hire-purchase through the internet
(1)
For the purpose of points 2 to 5 of this...
(2)
The appropriate label made available by suppliers in accordance with...
(3)
The image used for accessing the label in the case...
(4)
In the case of nested display, the sequence of display...
(5)
The appropriate product fiche made available by suppliers in accordance...
Commission Delegated Regulation (EU) No 392/2012
of 1 March 2012
supplementing Directive 2010/30/EU of the European Parliament and of the Council with regard to energy labelling of household tumble driers
(Text with EEA relevance)
THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 2010/30/EU of the European Parliament and of the Council of 19 May 2010 on the indication by labelling and standard product information of the consumption of energy and other resources by energy-related products , and in particular Article 10 thereof,
Whereas:
(1)
Directive 2010/30/EU requires the Commission to adopt delegated acts for the labelling of energy-related products representing significant potential for energy savings and presenting a wide disparity in performance levels with equivalent functionality.
(2)
Provisions for the energy labelling of household tumble driers were established by Commission Directive 95/13/EC of 23 May 1995 implementing Council Directive 92/75/EEC with regard to energy labelling of household electric tumble driers .
(3)
The energy used by household tumble driers accounts for a significant part of total household energy demand in the Union. In addition to the energy efficiency improvements already achieved, the scope for further reducing the energy consumption of household tumble driers is substantial.
(4)
Directive 95/13/EC should be repealed and new provisions should be laid down by this Regulation in order to ensure that the energy label provides dynamic incentives for suppliers to further improve the energy efficiency of household tumble driers and to accelerate market transformation towards energy-efficient technologies.
(5)
Household combined washer-driers are addressed in Commission Directive 96/60/EC of 19 September 1996 implementing Council Directive 92/75/EEC with regard to energy labelling of household combined washer-driers . They have particular characteristics and should therefore be exempted from the scope of this Regulation.
(6)
The information provided on the label should be obtained through reliable, accurate and reproducible measurement procedures which take into account the recognised state-of-the-art measurement methods, including, where available, harmonised standards adopted by the European standardisation bodies, as listed in Annex I to Directive 98/34/EC of the European Parliament and of the Council of 22 June 1998 laying down a procedure for the provision of information in the field of technical standards and regulations .
(7)
This Regulation should specify a uniform design and content for the label for household tumble driers, including gas-fired driers.
(8)
In addition, this Regulation should specify requirements as to the ‘technical documentation’ and the ‘product fiche’ for household tumble driers.
(9)
Moreover, this Regulation should specify requirements as to the information to be provided for any form of distance selling and advertisement of household tumble driers and any form of technical promotional material for such appliances.
(10)
It is appropriate to provide for a review of this Regulation in order to take into account technological progress.
(11)
In order to facilitate the transition from Directive 95/13/EC to this Regulation, household tumble driers labelled in accordance with this Regulation should be considered as compliant with Directive 95/13/EC.
(12)
Directive 95/13/EC should therefore be repealed,
HAS ADOPTED THIS REGULATION:
OJ L 153, 18.6.2010, p. 1.
OJ L 136, 21.6.1995, p. 28.
OJ L 266, 18.10.1996, p. 1.
OJ L 204, 21.7.1998, p. 37.