Verification procedure for market surveillance purposes
Article 6
The authorities of Great Britain shall apply the procedure set out in Annex V for assessing the conformity of the declared energy efficiency class, the energy consumption per cycle, the condensation efficiency class where applicable, the rated capacity, the power consumption in off-mode and left-on mode, the duration of the left-on mode, the programme time and airborne acoustical noise emissions.
Words in Art. 6 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 5 para. 6(3) (as amended by S.I. 2020/1528, regs. 1(2), 6(3)(4)(e)(vi)); 2020 c. 1, Sch. 5 para. 1(1)