Notification of errors by manufacturers
Article 10a. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (E.W.S) (3.1.2024) by The Vehicle Emissions Trading Schemes Order 2023 (S.I. 2023/1394), arts. 1(b), 113(1) (with art. 116); and revoked (N.I.) (1.1.2025) by The Vehicle Emissions Trading Schemes (Amendment) Order 2024 (S.I. 2024/1130), arts. 1(3), 20 (with art. 25)