Article 4a
Information on the special preservation conditions for oils subject to Article 1(1), namely that they must be stored away from light and heat, shall appear on their containers or on labels attached to them.
Inserted by Commission Implementing Regulation (EU) No 1335/2013 of 13 December 2013 amending Implementing Regulation (EU) No 29/2012 on marketing standards for olive oil.