Review of the cost-optimal calculations
Article 5
1
Member States shall review their cost-optimal calculations in time for the review of their minimum energy performance requirements required by Article 4(1) of Directive 2010/31/EU. For the review, in particular the price developments for the input cost data has to be reviewed and if need be updated.
2
The results of this review shall be transmitted to the Commission in the report provided for by Article 6 of this Regulation.