Article 5 Verification procedure for market surveillance purposes
When performing market surveillance checks to assess compliance with the requirements set out in Annex 1, the authorities of Great Britain must apply the verification procedure described in Annex 3.
Art. 5 substituted (31.12.2020) by The Ecodesign for Energy-Related Products and Energy Information (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/539), reg. 1(3), Sch. 2 para. 13(4) (as amended by S.I. 2020/1528, regs. 1(2), 6(3)(4)(b)(xii)); 2020 c. 1, Sch. 5 para. 1(1)