Article 1 Subject matter and scope
1. This Regulation establishes eco-design requirements for the placing on the market of electric mains-operated air conditioners with a rated capacity of ≤ 12 kW for cooling, or heating if the product has no cooling function, and comfort fans with an electric fan power input ≤ 125W.
2. This Regulation shall not apply to:
(a) appliances that use non-electric energy sources;
(b) air conditioners of which the condenser-side or evaporator-side, or both, do not use air for heat transfer medium.