Article 1
The entry concerning Ester Industries Limited, in the table in Article 2(2) of Regulation (EC) No 1292/2007, shall be replaced by the following:
Ester Industries Limited, DLF City, Phase II, Sector 25, Gurgaon, Haryana — 122022, India | 8,3 | A026