Commission Implementing Regulation (EU) No 1239/2012
of 19 December 2012
amending Regulation (EC) No 543/2008 laying down detailed rules for the application of Council Regulation (EC) No 1234/2007 as regards the marketing standards for poultrymeat
THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Council Regulation (EC) No 1234/2007 of 22 October 2007 establishing a common organisation of agricultural markets and on specific provisions for certain agricultural products (Single CMO Regulation) , and in particular Article 121(e), in conjunction with Article 4 thereof,
Whereas:
(1)
Article 15(1) and Article 20(1) of Commission Regulation (EC) No 543/2008 establish that frozen and quick-frozen chickens and certain poultry cuts may be marketed within the Union only if the water content does not exceed the technically unavoidable values determined by the methods of analysis described in Annexes VI, VII and VIII to that Regulation, respectively.
(2)
Article 16(1) of Regulation (EC) No 543/2008 provides that regular checks in accordance with Annex IX to that Regulation on the water absorbed or checks in accordance with Annex VI to that Regulation are to be carried out in the slaughterhouses.
(3)
Annexes VI and VII to Regulation (EC) No 543/2008 provide limit values for the water content of frozen and quick frozen chicken carcases, Annex VIII to that Regulation provides limit values for the water content of certain poultry cuts and Annex IX to that Regulation provides limit values for the water content of fresh poultrymeat in checks on the absorption of water in the production establishment. These limit values are all fixed by reference to three methods of chilling defined in Article 10 of that Regulation, namely air chilling, air-spray chilling and immersion chilling.
(4)
New technologies have given rise to the development of new chilling methods for which the same rules should apply as for the chilling methods defined in Article 10 of Regulation (EC) No 543/2008. Therefore, it is necessary to set down the limit values that will apply when new chilling methods are used.
(5)
Given that the new technologies for chilling poultry carcases are explored in order to improve the overall quality of poultrymeat, the limit values for these new chilling methods should not exceed the lowest limit values established for the air chilling method.
(6)
Annex XI to Regulation (EC) No 543/2008 contains the list of national reference laboratories. The competent authorities of Malta have notified the Commission of the new designation of their national reference laboratory.
(7)
Regulation (EC) No 543/2008 should therefore be amended accordingly.
(8)
The measures provided for in this Regulation are in accordance with the opinion of the Management Committee for the Common Organisation of Agricultural Markets,
HAS ADOPTED THIS REGULATION:
OJ L 299, 16.11.2007, p. 1.
OJ L 157, 17.6.2008, p. 46.