Amendments to Directive 2007/46/EC
Article 8
Annexes I, III, IX, and XVI to Directive 2007/46/EC are amended in accordance with Annex VI to this Regulation.
Annex XII to Directive 2007/46/EC is replaced by Annex VII to this Regulation.