CHAPTER III

PROCESSING OF PERSONAL DATA AND SECURITY

Retention of personal data of IMI users
Article 15
1
By way of derogation from Article 14, paragraphs 2 and 3 of this Article shall apply to the retention of personal data of IMI users
of the United Kingdom
. Those personal data shall include the full name and all electronic and other means of contact necessary for the purposes of this Regulation.
2
Personal data relating to IMI users shall be stored in IMI as long as they continue to be users of IMI and may be processed for purposes compatible with the objectives of this Regulation.
3
When a natural person ceases to be an IMI user, the personal data relating to that person shall be blocked by technical means for a period of three years. Those data shall, with the exception of their storage, only be processed for purposes of proof of an information exchange by means of IMI and shall be deleted at the end of the three-year period.
Regulation revoked (E.W.S.) (9.12.2022) by The Internal Market Information System Regulation (Amendment etc.) Regulations 2022 (S.I. 2022/1306), regs. 1(2), 5
Words in Art. 15(1) inserted (N.I.) (9.12.2022) by The Internal Market Information System Regulation (Amendment etc.) Regulations 2022 (S.I. 2022/1306), regs. 1(2), 3(14)