Commission Regulation (EU) No 87/2011
of 2 February 2011
designating the EU reference laboratory for bee health, laying down additional responsibilities and tasks for that laboratory and amending Annex VII to Regulation (EC) No 882/2004 of the European Parliament and of the Council (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 415/2013 of 6 May 2013 laying down additional responsibilities and tasks for the EU reference laboratories for rabies, bovine tuberculosis and bee health, amending Regulation (EC) No 737/2008 and repealing Regulation (EU) No 87/2011 Text with EEA relevance.

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX Certain responsibilities and tasks of the EU reference laboratory for bee health
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .