Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 415/2013 of 6 May 2013 laying down additional responsibilities and tasks for the EU reference laboratories for rabies, bovine tuberculosis and bee health, amending Regulation (EC) No 737/2008 and repealing Regulation (EU) No 87/2011 Text with EEA relevance.