TITLE III CONTROL OF FISHERIES

CHAPTER VII Engine power

Article 63 Physical verification
1. When propulsion power measurements are performed on board a fishing vessel in the framework of a physical verification of propulsion engine power as referred to in Article 41(2) of the Control Regulation, the propulsion engine power may be measured at the most accessible point between the propeller and the engine.
2. If the power of the propulsion engine is measured after the reduction gear, an appropriate correction shall be applied to the measurement in order to calculate the propulsion engine power at the engine output flange according to the definition in Article 5(1) of Regulation (EU) 2017/1130. That correction shall take into account the power losses resulting from the gearbox on the basis of the official technical data provided by the gearbox manufacturer.
Words in Art. 63(2) substituted (31.12.2020) by The Common Fisheries Policy (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/739), regs. 1, 5(52)(c); 2020 c. 1, Sch. 5 para. 1(1)