TITLE II GENERAL CONDITIONS FOR ACCESS TO WATERS AND RESOURCES

CHAPTER IV Vessel monitoring system

Article 22 Frequency of data transmission
1. A fisheries administration must ensure that its FMC receives, at least once every 2 hours, through the VMS the information referred to in Article 19 of this Regulation concerning fishing vessels in its fleet. The FMC may require the information at shorter time intervals.
Words in Art. 22 substituted (31.12.2020) by The Common Fisheries Policy (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/739), regs. 1, 5(19)(a); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 22 substituted (31.12.2020) by The Common Fisheries Policy (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/739), regs. 1, 5(19)(b); 2020 c. 1, Sch. 5 para. 1(1)
2. The FMC shall have the capacity of polling the actual position of each of its fishing vessels in its fleet.