TITLE VI

INSPECTION
CHAPTER III

Inspection report

Copy of the inspection report
Article 117
A copy of the inspection report referred to in Article 116 of this Regulation shall be sent to the operator no later than 15 working days after the completion of the inspection ....
Words in Art. 117 omitted (31.12.2020) by virtue of The Common Fisheries Policy (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/739), regs. 1, 5(87); 2020 c. 1, Sch. 5 para. 1(1)