TITLE VI

INSPECTION
CHAPTER I

Conduct of inspections
Section 3

Inspections in port

Inspections in port
Article 106
1
When carrying out inspections officials shall verify and note all appropriate items listed in the corresponding inspection report module set out in Annex XXVII to this Regulation. Officials shall have due regard to any specific requirements which apply to the inspected fishing vessel, in particular to relevant provisions in multi-annual plans.
2
When carrying out an inspection of a landing officials shall monitor the whole landing process from the beginning to the end of the respective operation. A cross-check shall be carried out between the quantities by species recorded in the prior notification of arrival to land fishery products, the quantities by species recorded in the fishing logbook and the quantities by species landed or transhipped whichever is applicable. This provision shall not exclude the possibility of an inspection taking place after the start of the landing.
3
A fisheries administration must ensure the effective inspection and control of premises used in connection with fishing activities and subsequent processing of fisheries products.
Words in Art. 106(3) substituted (31.12.2020) by The Common Fisheries Policy (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/739), regs. 1, 5(79); 2020 c. 1, Sch. 5 para. 1(1)