Criteria for iron and steel scrap
Article 3
Iron and steel scrap shall cease to be waste where, upon transfer from the producer to another holder, all of the following conditions are fulfilled:
1. the waste used as input for the recovery operation complies with the criteria set out in Section 2 of Annex I;
2. the waste used as input for the recovery operation has been treated in accordance with the criteria set out in Section 3 of Annex I;
3. the iron and steel scrap resulting from the recovery operation complies with the criteria set out in Section 1 of Annex I;
4. the producer has satisfied the requirements set out in Articles 5 and 6.