CHAPTER VII

APPROVED BODIES

Use of facilities outside the testing laboratory of the approved body
Article 46
1
On request of the manufacturer and where justified by technical, economic or logistic reasons, approved bodies may decide to carry out the tests referred to in Annex V, for the systems of assessment and verification of constancy of performance 1+, 1 and 3 or have such tests carried out under their supervision, either in the manufacturing plants using the test equipments of the internal laboratory of the manufacturer or, with the prior consent of the manufacturer, in an external laboratory, using the test equipments of that laboratory.
Approved bodies carrying out such tests shall be specifically designated as competent to work away from their own accredited test facilities.
2
Before carrying out those tests, the approved body shall verify whether the requirements of the test method are satisfied and shall evaluate whether:
a
test equipment has an appropriate calibration system and the traceability of the measurements is guaranteed;
b
the quality of the test results is ensured.
Ch. 7 heading substituted (31.12.2020) by The Construction Products (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/465), reg. 1, Sch. 1 para. 38 (with Sch. 1 para. 70) (as amended by S.I. 2020/1359, reg. 1, Sch. 1 para. 17); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 46 heading substituted (31.12.2020) by The Construction Products (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/465), reg. 1, Sch. 1 para. 46 (with Sch. 1 para. 70) (as amended by S.I. 2020/1359, reg. 1, Sch. 1 para. 17); 2020 c. 1, Sch. 5 para. 1(1)
Word in Art. 46 substituted (31.12.2020) by The Construction Products (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/465), reg. 1, Sch. 1 para. 46 (with Sch. 1 para. 70) (as amended by S.I. 2020/1359, reg. 1, Sch. 1 para. 17); 2020 c. 1, Sch. 5 para. 1(1)