CHAPTER IV

HARMONISED TECHNICAL SPECIFICATIONS

Dispute resolution in cases of disagreement between TABs
Article 23
If the TABs do not agree upon the UK Assessment Document within the time limits provided for, the responsible TAB shall submit this matter to the Secretary of State for appropriate resolution.
Word in Art. 23 substituted (31.12.2020) by The Construction Products (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/465), reg. 1, Sch. 1 para. 24(a) (with Sch. 1 para. 70) (as amended by S.I. 2020/1359, reg. 1, Sch. 1 para. 17); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 23 substituted (31.12.2020) by The Construction Products (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/465), reg. 1, Sch. 1 para. 24(b) (with Sch. 1 para. 70) (as amended by S.I. 2020/1359, reg. 1, Sch. 1 para. 17); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 23 substituted (31.12.2020) by The Construction Products (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/465), reg. 1, Sch. 1 para. 24(c) (with Sch. 1 para. 70) (as amended by S.I. 2020/1359, reg. 1, Sch. 1 para. 17); 2020 c. 1, Sch. 5 para. 1(1)