CHAPTER XII

FINAL PROVISIONS
Article 64
Regulation (EC) No 1777/2005 is hereby repealed.
References made to the repealed Regulation shall be construed as references to this Regulation and shall be read in accordance with the correlation table set out in Annex IV.