Council Regulation (EU) No 270/2011
of 21 March 2011
concerning restrictive measures directed against certain persons, entities and bodies in view of the situation in Egypt (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by virtue of The Misappropriation (Sanctions) (EU Exit) Regulations 2020 (S.I. 2020/1468), regs. 1(2), 38(b); S.I. 2020/1514, reg. 23(2)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 16 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX I

A. List of natural and legal persons, entities and bodies referred to in Article 2(1)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Rights of defence and right to effective judicial protection under Egyptian law:

The rights of defence and the right to effective judicial protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Application of the rights of defence and the right to effective judicial protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II List of competent authorities in the Member States referred to in Articles 4(1) and 5(1), Article 7 and Article 9(1)(a) and address for notifications to the Commission

BELGIUM
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

BULGARIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CZECH REPUBLIC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

DENMARK
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GERMANY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ESTONIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

IRELAND
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GREECE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SPAIN
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

FRANCE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CROATIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ITALY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CYPRUS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

LATVIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

LITHUANIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

LUXEMBOURG
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

HUNGARY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

MALTA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

NETHERLANDS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

AUSTRIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

POLAND
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PORTUGAL
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ROMANIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SLOVENIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SLOVAKIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

FINLAND
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SWEDEN
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

UNITED KINGDOM
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Address for notifications to the European Commission:
European Commission
Service for Foreign Policy Instruments (FPI)
EEAS 07/99
B-1049 Brussels, Belgium
E-mail: relex-sanctions@ec.europa.eu

Regulation revoked (31.12.2020) by virtue of The Misappropriation (Sanctions) (EU Exit) Regulations 2020 (S.I. 2020/1468), regs. 1(2), 38(b); S.I. 2020/1514, reg. 23(2)