Amendment to Regulation (EC) No 1222/2009
Article 1
Regulation (EC) No 1222/2009 is amended as follows:
1. in Annex I, part B, the first sentence is replaced by the following:
The wet grip class of C1 tyres must be determined on the basis of the wet grip index (G) according to the “A” to “G” scale specified in the table below and measured in accordance with Annex V.
;
2. the text set out in the Annex to this Regulation is added as Annex V.