Commission Regulation (EU) No 208/2011
of 2 March 2011
amending Annex VII to Regulation (EC) No 882/2004 of the European Parliament and of the Council and Commission Regulations (EC) No 180/2008 and (EC) No 737/2008 as regards lists and names of EU reference laboratories
(Text with EEA relevance)

THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Council Directive 90/426/EEC of 26 June 1990 on animal health conditions governing the movement and import from third countries of equidae, and in particular Article 19(iv) thereof,
OJ L 224, 18.8.1990, p. 42.
Having regard to Regulation (EC) No 882/2004 of the European Parliament and of the Council of 29 April 2004 on official controls performed to ensure the verification of compliance with feed and food law, animal health and animal welfare rules, and in particular Article 32(5) thereof,
OJ L 165, 30.4.2004, p. 1.
Having regard to Council Directive 2006/88/EC of 24 October 2006 on animal health requirements for aquaculture animals and products thereof, and on the prevention and control of certain diseases in aquatic animals, and in particular Article 55(1) thereof,
OJ L 328, 24.11.2006, p. 14.
Whereas:
(1) Regulation (EC) No 882/2004 lays down the general tasks, duties and requirements for Community reference laboratories for food and feed and for animal health and live animals. The Community reference laboratories for food and feed are listed in Part I and those for animal health and live animals in Part II of Annex VII to that Regulation.
(2) By Commission Regulation (EC) No 180/2008 of 28 February 2008 concerning the Community reference laboratory for equine diseases other than African horse sickness and amending Annex VII to Regulation (EC) No 882/2004 of the European Parliament and of the Council, the Agence Française de Sécurité Sanitaire des Aliments (AFSSA) with its research laboratories for animal pathology and zoonoses and for equine pathology and diseases, situated in France, was designated as the Community reference laboratory for equine diseases other than African horse sickness.
OJ L 56, 29.2.2008, p. 4.
(3) By Commission Regulation (EC) No 737/2008 of 28 July 2008 designating the Community reference laboratories for crustacean diseases, rabies and bovine tuberculosis, laying down additional responsibilities and tasks for the Community reference laboratories for rabies and bovine tuberculosis and amending Annex VII to Regulation (EC) No 882/2004 of the European Parliament and of the Council, the Laboratoire d’études sur la rage et la pathologie des animaux sauvages of the Agence Française de Sécurité Sanitaire des Aliments (AFSSA), Nancy, France, was designated as the Community reference laboratory for rabies.
OJ L 201, 30.7.2008, p. 29.
(4) France and Denmark have officially informed the Commission of changes relating to the name of laboratories referred to in those Regulations. In addition, after the entry into force of the Treaty of Lisbon, the laboratories listed in Annex VII to Regulation (EC) No 882/2004, previously referred to as ‘Community reference laboratories’ should now be referred to as ‘European Union (EU) reference laboratories’.
(5) It is important to keep the list of EU reference laboratories set out in Regulations (EC) No 882/2004, (EC) No 180/2008 and No 737/2008 updated. Those Regulations should therefore be amended accordingly.
(6) The measures provided for in this Regulation are in accordance with the opinion of the Standing Committee on the Food Chain and Animal Health,
HAS ADOPTED THIS REGULATION:

Article 1 Annex VII to Regulation (EC) No 882/2004 is replaced by the text in the Annex to this Regulation.
Article 2 In Regulation (EC) No 180/2008, Article 1 is replaced by the following:

‘Article 1 1. Agence nationale de sécurité sanitaire de l’alimentation, de l’environnement et du travail (ANSES) with its laboratories for animal health and equine diseases, France, is hereby designated as the EU Reference Laboratory for equine diseases other than African horse sickness from 1 July 2008 to 30 June 2013.
2. The functions, tasks and procedures regarding collaboration with laboratories responsible for diagnosing infectious diseases of equidae in the Member States of the EU Reference Laboratory referred to in paragraph 1 are set out in the Annex to this Regulation.’

Article 3 In Article 2 of Regulation (EC) No 737/2008, the first paragraph is replaced by the following:

‘The Laboratoire de la rage et de la faune sauvage de Nancy of the Agence nationale de sécurité sanitaire de l’alimentation, de l’environnement et du travail (ANSES), France, is hereby designated as the EU reference laboratory for rabies from 1 July 2008 until 30 June 2013.’

Article 4 This Regulation shall enter into force on the 20th day following its publication in the Official Journal of the European Union.
This Regulation shall be binding in its entirety and directly applicable in all Member States.
ANNEX Annex VII to Regulation (EC) No 882/2004 is replaced by the following:

‘ANNEX VII EUROPEAN UNION (EU) REFERENCE LABORATORIES
(Previously referred to as “COMMUNITY REFERENCE LABORATORIES”)

I. EU REFERENCE LABORATORIES FOR FEED AND FOOD

1. EU reference laboratory for milk and milk products
ANSES — Laboratoire de sécurité des aliments
Maisons-Alfort
France

2. EU reference laboratories for the analysis and testing of zoonoses (salmonella)
Rijksinstituut voor Volksgezondheid en Milieu (RIVM)
Bilthoven
The Netherlands

3. EU reference laboratory for the monitoring of marine biotoxins
Agencia Española de Seguridad Alimentaria (AESA)
Vigo
Spain

4. EU reference laboratory for monitoring the viral and bacteriological contamination of bivalve molluscs
The laboratory of the Centre for Environment, Fisheries and Aquaculture Science (Cefas)
Weymouth
United Kingdom

5. EU reference laboratory for Listeria monocytogenes
ANSES — Laboratoire de sécurité des aliments
Maisons-Alfort
France

6. EU reference laboratory for Coagulase positive Staphylococci, including Staphylococccus aureus
ANSES — Laboratoire de sécurité des aliments
Maisons-Alfort
France

7. EU reference laboratory for Escherichia coli, including Verotoxigenic E. coli (VTEC)
Istituto Superiore di Sanità (ISS)
Roma
Italy

8. EU reference laboratory for Campylobacter
Statens Veterinärmedicinska Anstalt (SVA)
Uppsala
Sweden

9. EU reference laboratory for parasites (in particular Trichinella, Echinococcus and Anisakis)
Istituto Superiore di Sanità (ISS)
Roma
Italy

10. EU reference laboratory for antimicrobial resistance
Fødevareinstituttet
Danmarks Tekniske Universitet
København
Denmark

11. EU reference laboratory for animal proteins in feedingstuffs
Centre wallon de recherches agronomiques (CRA-W)
Gembloux
Belgium

12. EU reference laboratories for residues of veterinary medicines and contaminants in food of animal origin

(a) For the residues listed in Annex I, Group A (1), (2), (3) and (4), Group B (2)(d) and Group B (3)(d) to Directive 96/23/EC
Rijksinstituut voor Volksgezondheid en Milieu (RIVM)
Bilthoven
The Netherlands

(b) For the residues listed in Annex I, Group B (1) and B (3)(e) to Directive 96/23/EC and carbadox and olaquindox
ANSES – Laboratoire de Fougères
France

(c) For the residues listed in Annex I, Group A (5) and Group B (2)(a), (b), (e) to Directive 96/23/EC
Bundesamt für Verbraucherschutz und Lebensmittelsicherheit (BVL)
Berlin
Germany

(d) For the residues listed in Annex I, Group B(3)(c) to Directive 96/23/EC
Instituto Superiore di Sanità
Roma
Italy

13. EU reference laboratory for transmissible spongiform encephalopathies (TSEs)
The laboratory referred to in Annex X, Chapter B of Regulation (EC) No 999/2001
The Veterinary Laboratories Agency
Addlestone
United Kingdom

14. EU reference laboratory for additives for use in animal nutrition
The laboratory referred to in Annex II of Regulation (EC) No 1831/2003 of the European Parliament and of the Council of 22 September 2003 on additives for use in animal nutrition:
OJ L 268, 18.10.2003, p. 29.
The Joint Research Centre of the European Commission
Geel
Belgium

15. EU reference laboratory for genetically modified organisms (GMOs)
The laboratory referred to in the Annex to Regulation (EC) No 1829/2003 of the European Parliament and of the Council of 22 September 2003 on genetically modified food and feed:
OJ L 268, 18.10.2003, p. 1.
The Joint Research Centre of the European Commission
Ispra
Italy

16. EU reference laboratory for material intended to come into contact with foodstuffs
The Joint Research Centre of the European Commission
Ispra
Italy

17. EU reference laboratories for residues of pesticides

(a) Cereals and feedingstuffs
Fødevareinstituttet
Danmarks Tekniske Universitet
København
Denmark

(b) Food of animal origin and commodities with high fat content
Chemisches und Veterinäruntersuchungsamt (CVUA) Freiburg
Freiburg
Germany

(c) Fruits and vegetables, including commodities with high water and high acid content
Laboratorio Agrario de la Generalitat Valenciana (LAGV)
Burjassot-Valencia
Spain
Grupo de Residuos de Plaguicidas de la Universidad de Almería (PRRG)
Almería
Spain

(d) Single residue methods
Chemisches und Veterinäruntersuchungsamt (CVUA) Stuttgart
Fellbach
Germany

18. EU reference laboratory for heavy metals in feed and food
The Joint Research Centre of the European Commission
Geel
Belgium

19. EU reference laboratory for Mycotoxins
The Joint Research Centre of the European Commission
Geel
Belgium

20. EU reference laboratory for Polycyclic Aromatic Hydrocarbons (PAH)
The Joint Research Centre of the European Commission
Geel
Belgium

21. EU reference laboratory for dioxins and PCBs in feed and food
Chemisches und Veterinäruntersuchungsamt (CVUA) Freiburg
Freiburg
Germany

II. EU REFERENCE LABORATORIES FOR ANIMAL HEALTH AND LIVE ANIMALS

1. EU reference laboratory for classical swine fever
The laboratory referred to in Council Directive 2001/89/EC of 23 October 2001 on Community measures for the control of classical swine fever.
OJ L 316, 1.12.2001, p. 5.

2. EU reference laboratory for African horse sickness
The laboratory referred to in Council Directive 92/35/EEC of 29 April 1992 laying down control rules and measures to combat African horse sickness.
OJ L 157, 10.6.1992, p. 19.

3. EU reference laboratory for avian influenza
The laboratory referred to in Council Directive 2005/94/EC of 20 December 2005 on Community measures for the control of avian influenza and repealing Directive 92/40/EEC.
OJ L 10, 14.1.2006, p. 16.

4. EU reference laboratory for Newcastle disease
The laboratory referred to in Council Directive 92/66/EEC of 14 July 1992 introducing Community measures for the control of Newcastle disease.
OJ L 260, 5.9.1992, p. 1.

5. EU reference laboratory for swine vesicular disease
The laboratory referred to in Council Directive 92/119/EEC of 17 December 1992 introducing general Community measures for the control of certain animal diseases and specific measures relating to swine vesicular disease.
OJ L 62, 15.3.1993, p. 69.

6. EU reference laboratory for fish diseases
Veterinærinstituttet
Afdeling for Fjerkræ, Fisk og Pelsdyr
Danmarks Tekniske Universitet
Aarhus
Denmark

7. EU reference laboratory for mollusc diseases
Ifremer — Institut français de recherche pour l’exploitation de la mer
La Tremblade
France

8. EU reference laboratory for monitoring the effectiveness of rabies vaccination
The laboratory referred to in Council Decision 2000/258/EC of 20 March 2000 designating a specific institute responsible for establishing the criteria necessary for standardising the serological tests to monitor the effectiveness of rabies vaccines.
OJ L 79, 30.3.2000, p. 40.

9. EU reference laboratory for bluetongue
The laboratory referred to in Council Directive 2000/75/EC of 20 November 2000 laying down specific provisions for the control and eradication of bluetongue.
OJ L 327, 22.12.2000, p. 74.

10. EU reference laboratory for African swine fever
The laboratory referred to in Council Directive 2002/60/EC of 27 June 2002 laying down specific provisions for the control of African swine fever and amending Directive 92/119/EEC as regards Teschen disease and African swine fever.
OJ L 192, 20.7.2002, p. 27.

11. EU reference laboratory for zootechnics
The laboratory referred to in Council Decision 96/463/EC of 23 July 1996 designating the reference body responsible for collaborating in rendering uniform the testing methods and the assessment of the results for pure-bred breeding animals of the bovine species.
OJ L 192, 2.8.1996, p. 19.

12. EU reference laboratory for foot-and-mouth disease
The laboratory referred to in Council Directive 2003/85/EC of 29 September 2003 on Community measures for the control of foot-and-mouth disease repealing Directive 85/511/EEC and Decisions 89/531/EEC and 91/665/EEC and amending Directive 92/46/EEC.
OJ L 306, 22.11.2003, p. 1.

13. EU reference laboratory for brucellosis
ANSES — Laboratoire de santé animale
Maisons-Alfort
France

14. EU reference laboratory for equine diseases other than African horse sickness
ANSES — Laboratoire de santé animale/Laboratoire de pathologie équine
Maisons-Alfort
France

15. EU reference laboratory for crustacean diseases
Centre for Environment, Fisheries & Aquaculture Science (Cefas)
Weymouth
United Kingdom

16. EU reference laboratory for rabies
ANSES — Laboratoire de la rage et de la faune sauvage de Nancy
Malzeville
France

17. EU reference laboratory for bovine tuberculosis
VISAVET — Laboratorio de vigilancia veterinaria, Facultad de Veterinaria, Universidad Complutense de Madrid
Madrid
Spain

18. EU reference laboratory for bee health
ANSES — Sophia-Antipolis Laboratory
Sophia-Antipolis
France
Inserted by Commission Regulation (EU) No 880/2011 of 2 September 2011 correcting Regulation (EU) No 208/2011 amending Annex VII to Regulation (EC) No 882/2004 of the European Parliament and of the Council and Commission Regulations (EC) No 180/2008 and (EC) No 737/2008 as regards lists and names of EU reference laboratories (Text with EEA relevance).’