ANNEX IV

PROCESSING
CHAPTER II

HYGIENE AND PROCESSING REQUIREMENTS
Section 3

Processing methods for Category 1 and Category 2 material
Unless the competent authority requires the application of pressure sterilisation (method 1), Category 1 and Category 2 material shall be processed in accordance with processing methods 2, 3, 4 or 5 as referred to in Chapter III.