Article 1
Article 1(1) of Regulation (EC) No 261/2008 shall be replaced by the following:
1.
A definitive anti-dumping duty is hereby imposed on imports of reciprocating compressors (excluding reciprocating compressor pumps), giving a flow not exceeding 2 cubic metres per minute, falling within CN codes ex 8414 40 10, ex 8414 80 22, ex 8414 80 28 and ex 8414 80 51, (TARIC codes 8414 40 10 10, 8414 80 22 19, 8414 80 22 99, 8414 80 28 11, 8414 80 28 91, 8414 80 51 19 and 8414 80 51 99) and originating in the People’s Republic of China. So-called mini-compressors, i.e. compressors without a tank and capable of operating on a 12 V power supply and falling within the abovementioned CN codes shall not be covered by the definitive anti-dumping duty.
.