Article 5
1
The competent authorities of the Member States shall decide on the validity of tenders on the basis of the conditions set out in Article 3.
2
Persons authorised to receive and examine the tenders shall be under an obligation not to disclose any particulars relating thereto to any unauthorised person.
3
Where the competent authorities of the Member States decide that a tender is invalid they shall inform the tenderer.
4
The competent authority concerned shall notify the Commission, by fax, of the admissible tenders submitted within 2 hours after the expiry of the time limit for the submissions laid down in Article 2(1) and (2). That notification shall not contain the data referred to in Article 3(4)(a)(i).
5
The form and content of the notifications shall be defined on the basis of models made available by the Commission to the Member States. When no tenders are submitted, the competent authority shall notify the Commission thereof by fax within the same time limit.