CHAPTER III

OBLIGATIONS OF THE SECRETARY OF STATE AND THE APPROVAL AUTHORITY

Collision avoidance systems
Article 11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Arts. 11-14 omitted (31.12.2022 at 11.00 p.m.) by virtue of The Road Vehicles and Non-Road Mobile Machinery (Type-Approval) (Amendment and Transitional Provisions) (EU Exit) Regulations 2022 (S.I. 2022/1273), regs. 1(2), 50(12)
Words in Ch. 3 heading substituted (31.12.2022 at 11.00 p.m.) by virtue of The Road Vehicles and Non-Road Mobile Machinery (Type-Approval) (Amendment and Transitional Provisions) (EU Exit) Regulations 2022 (S.I. 2022/1273), regs. 1(2), 50(6)