ANNEX I

2. DESCRIPTION OF THE RISK ASSESSMENT PROCESS

2.1. General description

2.1.4. The risk acceptability of the system under assessment shall be evaluated by using one or more of the following risk acceptance principles:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Implementing Regulation (EU) No 402/2013 of 30 April 2013 on the common safety method for risk evaluation and assessment and repealing Regulation (EC) No 352/2009 Text with EEA relevance.