Article 10 Safety requirements
Member States shall take the necessary measures to ensure that any changes to the existing systems referred to in Article 1(2) or the introduction of new systems are preceded by a safety assessment, including hazard identification, risk assessment and mitigation, conducted by the parties concerned.