Commission Regulation (EC) No 415/2007
of 13 March 2007
concerning the technical specifications for vessel tracking and tracing systems referred to in Article 5 of Directive 2005/44/EC of the European Parliament and of the Council on harmonised river information services (RIS) on inland waterways in the Community (repealed) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Merchant Shipping (Miscellaneous Provisions) (Amendments etc.) (EU Exit) Regulations 2018 (S.I. 2018/1221), regs. 2(b), 5(f); 2020 c. 1, Sch. 5 para. 1(1)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX Vessel tracking and tracing systems — Inland AIS

REFERENCES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ABBREVIATIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. The use of vessel tracking and tracing in inland navigation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Navigation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.1. Navigation, medium term ahead
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.2. Navigation, short-term ahead
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.3. Navigation, very short term ahead
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Vessel traffic management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.1. Vessel traffic services
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.1.1. Information service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.1.2. Navigational assistance service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.1.3. Traffic organisation service
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2. Lock planning and operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2.1. Lock planning, long-term
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2.2. Lock planning medium-term
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.2.3. Lock operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3. Bridge planning and operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.1. Bridge planning medium term
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.2. Bridge planning short term
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4.3.3. Bridge operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.5. Calamity abatement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6. Transport management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.1. Voyage planning
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.2. Transport logistics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.3. Intermodal port and terminal management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.6.4. Cargo and fleet management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.7. Enforcement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.8. Waterway and port infrastructure charges
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.9. Fairway information services
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.9.1. Weather warnings (EMMA)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.9.2. Signal status
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.9.3. Water level
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.10. Conclusion
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. INLAND AIS TECHNICAL SPECIFICATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Functional requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.1. General requirements for Inland AIS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2. Information content
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2.1. Static ship information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2.2. Dynamic ship information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2.3. Voyage related ship information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.2.4. Traffic management information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ETA at lock/bridge/terminal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

RTA at lock/bridge/terminal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Number of persons on board
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Signal status
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

EMMA warnings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Water levels
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Safety related messages
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.3. Reporting interval of information transmission
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.4. Technology platform
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.5. Compatibility to IMO Class A transponders
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.6. Unique identifier
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.7. Application identifier for Inland AIS application specific messages
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.8. Application requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3.9. Type-approval
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Protocol amendments for Inland AIS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.1. Message 1, 2, 3: position reports (ITU-R 1371)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.2. Message 5: ship static and voyage related data (ITU-R 1371)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.3. Message 23, group assignment command (ITU-R M.1371)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.4. Application of specific messages (ITU-R 1371)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.4.1. Allocation of function identifiers (FI) within the Inland AIS branch
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.4.2. Definition of inland specific messages
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message FI 10: inland ship static and voyage related data
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message FI 21: ETA at lock/bridge/terminal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message FI 22: RTA at lock/bridge/terminal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message FI 55: number of persons on board
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message FI23: EMMA warning
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message 24: water levels
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inland specific message 40: signal status
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix A DEFINITIONS

A.1 Services
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

River Information Services (RIS)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Vessel traffic management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Vessel traffic services (VTS)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

VTS area
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Navigational information
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Tactical traffic information (TTI)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Strategic traffic information (STI)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

(Vessel) tracking and tracing
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Vessel traffic monitoring
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Logistics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

A.2 Players
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Shipmaster
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Conning skipper
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

VTS operator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Competent authority
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

RIS authority
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

RIS operator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Lock operator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Bridge operator
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Terminal operator (synonym: stevedore)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Fleet manager
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Operator in calamity centres of emergency services
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Consignor (synonym: cargo shipper or sender)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Consignee
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Freight broker (Synonym: freight forwarder)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Supply forwarder
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Customs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix B EMMA CODES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix C Example of signal status

C.1 Light status
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

C.2 Signal forms
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix D PROPOSED DIGITAL INTERFACE SENTENCES FOR INLAND AIS

D.1 Input sentences
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

D.2 Inland waterway static ship data
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

D.3 Inland waterway voyage data
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Appendix E

ERI SHIP TYPES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix F Overview of information required by the user and the data fields, which are available in the defined Inland AIS messages
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .