Commission Regulation (EC) No 1981/2006of 22 December 2006on detailed rules for the implementation of Article 32 of Regulation (EC) No 1829/2003 of the European Parliament and of the Council as regards the Community reference laboratory for genetically modified organisms(Text with EEA relevance) (revoked)
Article 1
Subject matter and scope
Article 2
Definitions
Article 3
Contributions
Article 4
Reductions and exemptions
Article 5
Procedure
Article 6
National reference laboratories assisting the CRL for testing and validating the methods of detection and identification
Article 7
Reporting
Article 8
Amendment to Regulation (EC) No 1829/2003
Article 9
Entry into force
ANNEX I
Requirements for laboratories assisting the Community reference laboratory for testing and validation of methods for detection, as referred to in Article 6(1)
ANNEX II
National reference laboratories assisting the CRL for testing and validation of methods for detection, as referred to in Article 6(1)
Belgique/België
Bulgaria
Česká republika
Danmark
Deutschland
Eesti
Éire
Elláda
España
France
Hrvatska
Italia
Kypros
Latvija
Lietuva
Luxembourg
Magyarország
Malta
Nederland
Österreich
Polska
Portugal
România
Slovenija
Slovensko
Suomi/Finland
Sverige
United Kingdom
ANNEX III
Amendments to the Annex to Regulation (EC) No 1829/2003
Commission Regulation (EC) No 1981/2006
of 22 December 2006
on detailed rules for the implementation of Article 32 of Regulation (EC) No 1829/2003 of the European Parliament and of the Council as regards the Community reference laboratory for genetically modified organisms
(Text with EEA relevance) (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (31.12.2020) by The Genetically Modified Food and Feed (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/705), regs. 1, 477 (as substituted by S.I. 2020/1504, regs. 1(2), 17(22))