Sampling and analysis
Article 8
The sampling and the analysis for the official control of the maximum levels specified in the Annex shall be performed in accordance with Commission Regulations (EC) No 1882/2006 , No 401/2006 , No 1883/2006 and Commission Directives 2001/22/EC , 2004/16/EC and 2005/10/EC .
See page 25 of this Official Journal.
OJ L 70, 9.3.2006, p. 12.
See page 32 of this Official Journal.
OJ L 77, 16.3.2001, p. 14. Directive as amended by Directive 2005/4/EC (OJ L 19, 21.1.2005, p. 50).
OJ L 42, 13.2.2004, p. 16.
OJ L 34, 8.2.2005, p. 15.