Approved laboratories
Article 8
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2
Tests required by this Regulation may be carried out by approved laboratories only.
‘Approved laboratories’ are laboratories that are:
- — members of the UK GLP compliance programme referred to in the Good Laboratory Practice Regulations 1999 , or
- — able to demonstrate compliance with standard EN ISO/IEC 17025: 2017 (general requirements for the competence of testing and calibration laboratories) to the satisfaction of the competent authority.
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4
The competent authority shall publish a list of approved laboratories.
Art. 8 heading substituted (31.12.2020) by The Detergents (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/672), regs. 1, 11(2); 2020 c. 1, Sch. 5 para. 1(1)
Art. 8(4) substituted (31.12.2020) by The Detergents (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/672), regs. 1, 11(6); 2020 c. 1, Sch. 5 para. 1(1)
Art. 8(1) omitted (31.12.2020) by virtue of The Detergents (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/672), regs. 1, 11(3); 2020 c. 1, Sch. 5 para. 1(1)
Art. 8(2) substituted (31.12.2020) by The Detergents (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/672), regs. 1, 11(4)); 2020 c. 1, Sch. 5 para. 1(1)
Art. 8(3) omitted (31.12.2020) by virtue of The Detergents (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/672), regs. 1, 11(5); 2020 c. 1, Sch. 5 para. 1(1)