Regulation (EC) No 552/2004 of the European Parliament and of the Council
of 10 March 2004
on the interoperability of the European Air Traffic Management network
(the interoperability Regulation)
(Text with EEA relevance)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation repealed (with savings) (11.9.2018) by Regulation (EU) 2018/1139 of the European Parliament and of the Council of 4 July 2018 on common rules in the field of civil aviation and establishing a European Union Aviation Safety Agency, and amending Regulations (EC) No 2111/2005, (EC) No 1008/2008, (EU) No 996/2010, (EU) No 376/2014 and Directives 2014/30/EU and 2014/53/EU of the European Parliament and of the Council, and repealing Regulations (EC) No 552/2004 and (EC) No 216/2008 of the European Parliament and of the Council and Council Regulation (EEC) No 3922/91 (Text with EEA relevance), Arts. 139(2), 141; and Regulation (as saved) amended (31.12.2020) by The Air Traffic Management (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/459), regs. 1(2), 57-63; 2020 c. 1, Sch. 5 para. 1(1)

CHAPTER I GENERAL PROVISIONS

Article 1 Objective and scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER II ESSENTIAL REQUIREMENTS, IMPLEMENTING RULES FOR INTEROPERABILITY AND COMMUNITY SPECIFICATIONS

Article 2 Essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Implementing rules for interoperability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Community specifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER III VERIFICATION OF COMPLIANCE

Article 5 EC declaration of conformity or suitability for use of constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 EC declaration of verification of systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6a Alternative verification of compliance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Safeguards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Notified bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

CHAPTER IV FINAL PROVISIONS

Article 9 Revision of Annexes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Transitional arrangements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 12 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I LIST OF SYSTEMS FOR AIR NAVIGATION SERVICES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II ESSENTIAL REQUIREMENTS

Part A: General requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Civil-military coordination
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Environmental constraints
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Principles governing the logical architecture of systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Principles governing the construction of systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Part B: Specific requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Systems and procedures for airspace management

1.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Systems and procedures for air traffic flow management

2.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Systems and procedures for air traffic services

3.1. Flight data processing systems

3.1.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Surveillance data processing systems

3.2.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Human-machine interface systems

3.3.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Communications systems and procedures for ground-to-ground, air-to-ground and air-to-air communications

4.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Navigation systems and procedures

5.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Surveillance systems and procedures

6.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Systems and procedures for aeronautical information services

7.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. Systems and procedures for the use of meteorological information

8.1. Seamless operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8.2. Support for new concepts of operation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III CONSTITUENTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Contents of the EC declaration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV SYSTEMS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Contents of EC declaration of verification of systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Verification procedure for systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Technical file
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Submission
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V NOTIFIED BODIES
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. The staff responsible for inspection must have:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .