Specific reference levels
Article 1
The specific reference levels for the fleets registered in the outermost regions of France, Portugal and Spain are fixed in the Annex hereto for each fleet segment.
These specific reference levels are the maximum capacity levels, in GT and in kW, that the Member States shall be authorised to accept through entries to the fleet by way of derogation from Article 13 of Regulation (EC) No 2371/2002.