CHAPTER I
SUBJECT MATTER
Article 1
Establishment of the Agency
Article 1a
Definitions
CHAPTER II
TASKS
Article 2
Main tasks
Article 2a
Code of Conduct
Article 3
Joint operations and pilot projects at the external borders
Article 3a
Organisational aspects of joint operations and pilot projects
Article 3b
Composition and deployment of European Border Guard Teams
Article 3c
Instructions to the European Border Guard Teams
Article 4
Risk analysis
Article 5
Training
Article 6
Monitoring and contributing to research
Article 7
Technical equipment
Article 8
Support to Member States in circumstances requiring increased technical and operational assistance at external borders
Article 8a
Rapid interventions
Article 8b
Composition of teams
Article 8c
Training and exercises
Article 8d
Procedure for deciding on deployment of the teams
Article 8e
Operational plan
Article 8f
National contact point
Article 8g
Coordinating Officer
Article 8h
Costs
Article 9
Return cooperation
Article 10
Tasks and powers of guest officers
Article 10a
Accreditation document
Article 10b
Civil liability
Article 10c
Criminal liability
Article 11
Information exchange systems
Article 11a
Data protection
Article 11b
Processing of personal data in the context of joint return operations
Article 11c
Processing of personal data collected during joint operations, pilot projects and rapid interventions
Article 11ca
Processing of personal data in the framework of EUROSUR
Article 11d
Security rules on the protection of classified information and non-classified sensitive information
Article 12
Cooperation with Ireland and the United Kingdom
Article 13
Cooperation with Union agencies and bodies and international organisations
Article 14
Facilitation of operational cooperation with third countries and cooperation with competent authorities of third countries
CHAPTER III
STRUCTURE
Article 15
Legal status and location
Article 15a
Headquarters Agreement
Article 16
Specialised branches
Article 17
Staff
Article 18
Privileges and immunities
Article 19
Liability
Article 20
Powers of the Management Board
Article 21
Composition of the Management Board
Article 22
Chairmanship of the Management Board
Article 23
Meetings
Article 24
Voting
Article 25
Functions and powers of the Executive Director
Article 26
Appointment of senior officials
Article 26a
Fundamental Rights Strategy
Article 27
Translation
Article 28
Transparency and communication
CHAPTER IV
FINANCIAL REQUIREMENTS
Article 29
Budget
Article 30
Implementation and control of the budget
Article 31
Combating fraud
Article 32
Financial provision
CHAPTER V
FINAL PROVISIONS
Article 33
Evaluation
Article 34
Entry into force
Council Regulation (EC) No 2007/2004
of 26 October 2004
establishing a European Agency for the Management of Operational Cooperation at the External Borders of the Member States of the European Union (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EU) 2016/1624 of the European Parliament and of the Council of 14 September 2016 on the European Border and Coast Guard and amending Regulation (EU) 2016/399 of the European Parliament and of the Council and repealing Regulation (EC) No 863/2007 of the European Parliament and of the Council, Council Regulation (EC) No 2007/2004 and Council Decision 2005/267/EC.