CHAPTER 5

RULES CONCERNING SPECIFIC GOODS AND MOVEMENTS
Article 14
In addition to the provisions of the Regulation (EC) No 638/2004, specific goods and movements shall be subject to the rules set out in this Chapter ....
Words in Art. 14 omitted (31.12.2020) by virtue of The Statistics of Trade (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/47), regs. 1(4), 5(1)(i); 2020 c. 1, Sch. 5 para. 1(1)