Regulation (EC) No 782/2003 of the European Parliament and of the Council
of 14 April 2003
on the prohibition of organotin compounds on ships (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (10.5.2024) by The Merchant Shipping (Anti-Fouling Systems) Regulations 2024 (S.I. 2024/509), reg. 1(1), Sch. Pt. 2 (with reg. 4)

Article 1 Objective
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Definitions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Prohibition of the application of organotin compounds which act as biocides
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Prohibition of the bearing of organotin compounds which act as biocides
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Survey and certification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 7 Port State control
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 8 Adaptations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 9 Committee procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 10 Evaluation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 11 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I Surveys and certification requirements for anti-fouling systems on United Kingdom ships

1. Surveys
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Certification
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX II . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX III . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .