CHAPTER XVI

INSPECTION OF FILES AND KEEPING OF FILES

Parts of the file excluded from inspection
Article 72. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Inspection of the Register of Community Designs
Article 73. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Procedures for the inspection of files
Article 74. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Communication of information contained in the files
Article 75. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Keeping of files
Article 76. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulation revoked (1.1.2024) by Retained EU Law (Revocation and Reform) Act 2023 (c. 28), ss. 1(1), 22(3), Sch. 1 Pt. 2 (with s. 1(3)(4)); S.I. 2023/1363, reg. 2