Repeals
Article 8
Regulations (EC) No 1981/94 and (EC) No 934/95 are hereby repealed.
References to Regulations (EC) No 1981/94 and (EC) No 934/95 shall be deemed to refer to this Regulation and read according to the correspondence table in Annex XIII.