TITLE III

STRUCTURE OF the UK Societas
Section 3

Rules common to the one-tier and two-tier systems
Article 46
1
Members of company organs shall be appointed for a period laid down in the statutes not exceeding six years.
2
Subject to any restrictions laid down in the statutes, members may be reappointed once or more than once for the period determined in accordance with paragraph 1.
Words in Title 3 heading substituted (31.12.2020) by The European Public Limited-Liability Company (Amendment etc.) (EU Exit) Regulations 2018 (S.I. 2018/1298), regs. 1, 110 (with regs. 140-145) (as amended by S.I. 2020/523, regs. 1(2), 5(a)-(f)); 2020 c. 1, Sch. 5 para. 1(1)