TITLE IV

FINAL PROVISIONS
Article 11
Regulation (EC) No 1808/95 is hereby repealed.
References to Regulation (EC) No 1808/95 shall be construed as references to this Regulation and shall be correlated in accordance with the table in Annex VIII.