Council Regulation (EEC) No 3181/78
of 18 December 1978
relating to the European monetary system (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Regulation (EC) No 640/2006 of 10 April 2006 repealing Regulations (EEC) No 3181/78 and (EEC) No 1736/79 concerning the European Monetary System.